From 7a796c76c2357411e6f3a564cda92031550cb989 Mon Sep 17 00:00:00 2001
From: Jarek Ostrowski <jostrowski@gitlab.com>
Date: Tue, 16 Jul 2019 17:31:12 +0000
Subject: Align merge request icons and text

Align icons left
Align text left
Adjust padding to be consistent
Make icons same 24 size
Add changelog mr number
Add right margin to widget status container
Add left margin inside widget icon container
Prepend left padding for error message
Only give button left margin, some have buttons
Prettify
Adjust test summary icons
Prettify
Fix empty line before lint
Remove author
Switch to use gl-padding
Use utility classes instead
Prettify
Change loading icon size to md
Update summary_row.vue
---
 .../vue_merge_request_widget/components/mr_widget_status_icon.vue     | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'app/assets/javascripts/vue_merge_request_widget/components/mr_widget_status_icon.vue')

diff --git a/app/assets/javascripts/vue_merge_request_widget/components/mr_widget_status_icon.vue b/app/assets/javascripts/vue_merge_request_widget/components/mr_widget_status_icon.vue
index 392eb6fb425..8dbd9e52cfe 100644
--- a/app/assets/javascripts/vue_merge_request_widget/components/mr_widget_status_icon.vue
+++ b/app/assets/javascripts/vue_merge_request_widget/components/mr_widget_status_icon.vue
@@ -32,8 +32,8 @@ export default {
 };
 </script>
 <template>
-  <div class="space-children d-flex append-right-10 widget-status-icon">
-    <div v-if="isLoading" class="mr-widget-icon"><gl-loading-icon size="md" /></div>
+  <div class="d-flex widget-status-icon">
+    <div v-if="isLoading" class="mr-widget-icon"><gl-loading-icon size="sm" /></div>
 
     <ci-icon v-else :status="statusObj" :size="24" />
 
-- 
cgit v1.2.3

